en	Link validator

en	Introduction

en	Check Links for validity

en	Overview of links on website

en	Overview - choose options to check the links

en	Total amounts in tt_content

en	Records with ext. links:

en	External links:

en	Amounts from actual branch in tt_content

en	Records with ext. links:

en	External links:

en	Attention:

en	Checking links may take up to several minutes. Checking ONE link can last up to 3 seconds.

en	Report

en	Check Links

en	Show these types of broken links

en	Check these types of broken links

en	Show this level

en	Check this level

en	Broken links total:

en	Internal Links:

en	File Links:

en	External Links:

en	Linkhandler Links:

en	Refresh display

en	Check links

en	Listing of broken links

en	Path

en	Element

en	Link

en	URL / Link Target

en	Error message

en	Last check

en	Edit element containing this broken link

en	(Field: %s)

en	no headline

en	Page '###title###' (###uid###) is deleted.

en	Page '###title###' (###uid###) is not visible.

en	Page (###uid###) does not exist.

en	Element '###title###' (###uid###) is not located on page ###wrongpage###, but on page ###rightpage###.

en	Element '###title###' (###uid###) is deleted.

en	Element '###title###' (###uid###) is not visible.

en	Element (###uid###) does not exist.

en	###title### row (###uid###) is not visible.

en	###title### row (###uid###) is deleted.

en	Linked

en	Row (###uid###) does not exist.

en	No information about the error is available.

en	External Link not reachable.

en	A redirect loop occurred. (%s: %s)

en	Accessing this address is not allowed (403).

en	The requested url was not found (404).

en	External Link returned HTTP error code (%s).

en	File doesn't exist.

en	Operation timeout. The specified time-out period was reached according to the conditions.

en	Internal Server Error (500)

en	Could not resolve host. The given remote host was not resolved.

en	Failure with receiving network data.

en	An error occurred (%s): "%s".

en	Exception: %s

en	Ok

en	%1$s %2$s

en	No broken links to show!

en	There are no broken links to be displayed.

en	No access!

en	You do not have access to these listings.