en	Path to the temporary directory:This directory will contain temporary files for encryption/decrytion. It should be located outside of the web site root and it should not be /tmp. Directory permissions should be 0700 and the owner should be the web server user. If left empty, typo3conf/ will be used and it is INSECURE! Make sure that the directory is included into open_basedir if you use this setting.