en	Number of records to process

en	Number of records to process for each run. If enabled for both FE & BE, the value will be doubled.

en	Converting a password to a salted hash takes some milliseconds (~100ms on an entry system in 2010). If all users are updated in one run, the task might run a long time if a lot of users must be handled. Therefore only a small number of frontend and backend users are processed. If saltedpasswords is enabled for both FE & BE, this value will be doubled.

en	Deactivate this task

en	Whether the task should deactivate itself after all records are processed. Uncheck this if you are importing users from an external source and/or need to run this task periodically.