en	Static templates are a centrally distributed TypoScript library. You should never change these values.

en	The Static templates are meant to be included by your TypoScript Template records depending on your needs. Refer to the 'TSref' document (see below) for details on this process. Notice that by each release of TYPO3 you should reinstall the Static Templates table by the install tool. See the 'Install/Upgrade' document for details (see below).

en	sys_template TSref | https://docs.typo3.org/typo3cms/TyposcriptReference/ TypoScript in 45 min| https://docs.typo3.org/typo3cms/TyposcriptIn45MinutesTutorial/ Install/Upgrade | https://docs.typo3.org/typo3cms/InstallationGuide/, sys_template:include_static

en	EXT:context_help/Resources/Public/Images/cshimages/static.png

en	The static templates are located in the page tree root where only the Admin users can access them. However they are read-only by default so you can only look at their content, not change it.

en	Template Title. Will be visible in the list of static templates in Template Records

en	TypoScript Constants field

en	sys_template:constants

en	TypoScript Setup code field

en	sys_template:config

en	Inclusion of other static templates

en	Description of the static template record.

en	Editor Configuration - used to configure Stylesheet editor.