en	This option will hide the news from showing up at the login screen.

en	Enter the title of the news.

en	The news content to let editors know what's coming up. HTML is disabled, however, you can use line breaks.

en	System news are shown at the TYPO3 login screen, allowing admins to inform editors about upcoming system maintenance and similar events.