en	Legend:

en	edited

en	moved

en	deleted

en	created

en	hidden

en	Workspaces

en	ok

en	cancel

en	choose Mass Action

en	choose Action

en	item

en	items

en	Records to display

en	review and publish

en	Workspace List

en	You are in LIVE workspace. You have to select a draft workspace before you can review and publish changes.

en	Send to stage

en	Publish to LIVE

en	Close

en	Done processing %d elements

en	init

en	Really publish entire workspace?

en	Really swap entire workspace?

en	Do you really want to discard changes from the whole workspace?

en	Really publish selected elements?

en	Really swap selected elements?

en	Really discard changes of the selected elements?

en	Please note that this will affect all changes in the current workspace, which may be more than you are currently seeing on your screen.

en	Generate page preview links

en	Preview Link

en	The server did not send any response whether the action was successful.

en	Row details...

en	Difference

en	Modification

en	Current Stage

en	Actions

en	Path

en	Changed

en	WS-Id

en	Live-Id

en	Workspace

en	Live-Path

en	Live-Title

en	Swap workspace

en	Preview element

en	Edit element

en	Open version of page

en	Send record to previous Stage

en	Send record to next Stage

en	Discard workspace version of record.

en	Swap live and workspace versions of record

en	Show history of workspace version

en	Discard workspace version of record.

en	Discard all workspace version of current page.

en	Do you really want to discard this version from workspace?

en	Do you really want to discard all versions from page?

en	Swap version

en	Do you really want to swap this version?

en	Prepare to start mass action

en	Prepare to execute actions on selection

en	StageId is supposed to be an integer

en	The stage to be used seems to be invalid and cannot be used. Please consider to use the update wizard in the install tool to fix this.

en	The record element could not be found.

en	The record element is already in editing stage, there is no previous stage.

en	The selected element(s) will be sent to

en	Send mail to

en	Additional recipients

en	Comments

en	Stage not found

en	It seems that you're still using old-style workspace. Please use the update scripts in the TYPO3 Install Tool to run the necessary updates. If you continue using this module without migrating your workspace you might loose data.

en	New Page!

en	The previewed page has been created in a workspace and has no live counterpart.

en	Visual preview

en	List view

en	Live

en	Click this element to hide the workspace version and see the live version of the page.

en	Workspace

en	Click this element to hide the live version and see the workspace version of the page.

en	Slider

en	Vertical

en	Horizontal

en	Publish

en	Swap

en	Discard

en	Generate Workspace Preview Links

en	Element is in workspace stage "%s", modifications will send it back to "%s".

en	Live Workspace

en	Workspace version

en	<b>Current stage step</b>: {0} (<b>{1}</b>/{2})

en	<b>Path</b>: {0}

en	Stage {0}

en	User comments for <b>step {0} of stage</b> "{1}"

en	all languages

en	all languages

en	Record "%s" depends on default language record

en	Default language record for record "%s"

en	The integrity check discovered several issues, see status icons infront of each record for further details.

en	Do you want to continue?

en	Information

en	Warning

en	Error